-- CVS ID: $Id: library_insert.sql,v 1.1 2012/11/15 14:39:29 andreyb Exp $
 
INSERT INTO lams_learning_library
(
description,
title,
valid_flag,
create_date_time
)
VALUES
(
'Kaltura Tool',
'Kaltura',
0,
NOW()
)
