-- CVS ID: $Id: drop_lams_tool_wiki.sql,v 1.1 2008/10/08 05:33:00 lfoxton Exp $
 
SET FOREIGN_KEY_CHECKS=0;
DROP TABLE IF EXISTS tl_lawiki10_user;
DROP TABLE IF EXISTS tl_lawiki10_attachment;
DROP TABLE IF EXISTS tl_lawiki10_session;
DROP TABLE IF EXISTS tl_lawiki10_wiki;
SET FOREIGN_KEY_CHECKS=1;





