Index: unix_installer/upgrader-package/bin/lamsdump.sql
===================================================================
diff -u -r0965ee8a6bd49be2d53cad08225f707b32a61674 -r9fd5236dbae4577a841b5e4de5132768436954d5
--- unix_installer/upgrader-package/bin/lamsdump.sql	(.../lamsdump.sql)	(revision 0965ee8a6bd49be2d53cad08225f707b32a61674)
+++ unix_installer/upgrader-package/bin/lamsdump.sql	(.../lamsdump.sql)	(revision 9fd5236dbae4577a841b5e4de5132768436954d5)
@@ -1 +1 @@
-/usr/bin//mysqldump -ulams -plamsdemo lams > /home/lfoxton/backup/lams.dump
\ No newline at end of file
+/usr/bin//mysqldump -ulamsuser -plamsdemo lamstest > /home/lfoxton/backup/lams.dump
\ No newline at end of file
