Index: win_installer/updater/src/sql/removeConfigs.sql
===================================================================
diff -u -rce527ca7142b00c27f254eba5e868c3712cedd06 -r4133d4a50a076876e19024fe114838a542442256
--- win_installer/updater/src/sql/removeConfigs.sql	(.../removeConfigs.sql)	(revision ce527ca7142b00c27f254eba5e868c3712cedd06)
+++ win_installer/updater/src/sql/removeConfigs.sql	(.../removeConfigs.sql)	(revision 4133d4a50a076876e19024fe114838a542442256)
@@ -17,14 +17,14 @@
 delete from lams_qtz_TRIGGERS;
 delete from lams_qtz_JOB_DETAILS;
 
--- From 2.2 onwards. WINDOWS ONLY. Make sure quatz tables are set as capitals
+-- From 2.2 onwards. WINDOWS ONLY. Make sure quartz tables are set as capitals
 rename table lams_qtz_blob_triggers to lams_qtz_BLOB_TRIGGERS;
 rename table lams_qtz_calendars to lams_qtz_CALENDARS;
 rename table lams_qtz_cron_triggers to lams_qtz_CRON_TRIGGERS;
 rename table lams_qtz_fired_triggers to lams_qtz_FIRED_TRIGGERS;
 rename table lams_qtz_job_details to lams_qtz_JOB_DETAILS;
 rename table lams_qtz_job_listeners to lams_qtz_JOB_LISTENERS;
-rename table lams_qtz_locks to ams_qtz_LOCKS;
+rename table lams_qtz_locks to lams_qtz_LOCKS;
 rename table lams_qtz_paused_trigger_grps to lams_qtz_PAUSED_TRIGGER_GRPS;
 rename table lams_qtz_scheduler_state to lams_qtz_SCHEDULER_STATE;
 rename table lams_qtz_simple_triggers to lams_qtz_SIMPLE_TRIGGERS;
