Index: win_installer/updater/src/sql/removeConfigs.sql
===================================================================
diff -u -re0a6c0ebbb7175fd9dc07bbae37716a58a27dbaf -reb7019fc0939500c34fbb198f3c85b395c785a09
--- win_installer/updater/src/sql/removeConfigs.sql	(.../removeConfigs.sql)	(revision e0a6c0ebbb7175fd9dc07bbae37716a58a27dbaf)
+++ win_installer/updater/src/sql/removeConfigs.sql	(.../removeConfigs.sql)	(revision eb7019fc0939500c34fbb198f3c85b395c785a09)
@@ -35,3 +35,6 @@
 update lams_configuration set config_value="" where config_key="Red5ServerUrl";
 update lams_configuration set config_value="" where config_key="Red5RecordingsUrl";
 
+-- From 2.3 onwards. Ensure video recorder tool is set to disabled
+update lams_learning_library set valid_flag=0 where title="VideoRecorder";
+
