Index: lams_tool_daco/db/sql/tool_insert.sql
===================================================================
RCS file: /usr/local/cvsroot/lams_tool_daco/db/sql/tool_insert.sql,v
diff -u -r1.6.2.1 -r1.6.2.2
--- lams_tool_daco/db/sql/tool_insert.sql	24 Feb 2016 12:35:52 -0000	1.6.2.1
+++ lams_tool_daco/db/sql/tool_insert.sql	27 Feb 2017 14:00:11 -0000	1.6.2.2
@@ -1,7 +1,3 @@
-# Connection: ROOT LOCAL
-# Host: localhost
-# Saved: 2005-04-07 10:42:43
-# 
 INSERT INTO lams_tool
 (
 tool_signature,
@@ -10,8 +6,6 @@
 description,
 tool_identifier,
 tool_version,
-learning_library_id,
-default_tool_content_id,
 valid_flag,
 grouping_support_type_id,
 supports_run_offline_flag,
@@ -35,8 +29,6 @@
 'Collecting data with custom structure.',
 'daco',
 '@tool_version@',
-NULL,
-NULL,
 0,
 2,
 1,
@@ -51,4 +43,4 @@
 NOW(),
 NOW(),
 1
-)
+)
\ No newline at end of file
