Index: lams_tool_pixlr/db/sql/tool_insert.sql
===================================================================
RCS file: /usr/local/cvsroot/lams_tool_pixlr/db/sql/tool_insert.sql,v
diff -u -r1.4.2.2 -r1.4.2.3
--- lams_tool_pixlr/db/sql/tool_insert.sql	11 May 2016 07:37:25 -0000	1.4.2.2
+++ lams_tool_pixlr/db/sql/tool_insert.sql	27 Feb 2017 14:00:28 -0000	1.4.2.3
@@ -1,5 +1,3 @@
-
- 
 INSERT INTO lams_tool
 (
 tool_signature,
@@ -8,8 +6,6 @@
 description,
 tool_identifier,
 tool_version,
-learning_library_id,
-default_tool_content_id,
 valid_flag,
 grouping_support_type_id,
 supports_run_offline_flag,
@@ -34,8 +30,6 @@
 'Pixlr',
 'pixlr',
 '@tool_version@',
-NULL,
-NULL,
 0,
 2,
 1,
@@ -51,4 +45,4 @@
 NOW(),
 0,
 'tool/lapixl10/lapixl10admin.do'
-)
+)
\ No newline at end of file
