Index: win_installer/templates/update_lams_configuration.sql
===================================================================
RCS file: /usr/local/cvsroot/win_installer/templates/Attic/update_lams_configuration.sql,v
diff -u -r1.1 -r1.2
--- win_installer/templates/update_lams_configuration.sql	20 Oct 2006 05:40:18 -0000	1.1
+++ win_installer/templates/update_lams_configuration.sql	31 Oct 2006 06:29:42 -0000	1.2
@@ -10,3 +10,4 @@
 update lams_configuration set config_value='@WILDFIRE_CONFERENCE@' where config_key='XmppConference';
 update lams_configuration set config_value='@WILDFIRE_USER@' where config_key='XmppAdmin';
 update lams_configuration set config_value='@WILDFIRE_PASS@' where config_key='XmppPassword';
+update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where user_id=1;
