Index: win_installer/templates/update_lams_configuration.sql
===================================================================
RCS file: /usr/local/cvsroot/win_installer/templates/Attic/update_lams_configuration.sql,v
diff -u -r1.5 -r1.6
--- win_installer/templates/update_lams_configuration.sql	1 Mar 2007 05:15:25 -0000	1.5
+++ win_installer/templates/update_lams_configuration.sql	2 Mar 2007 00:35:19 -0000	1.6
@@ -12,8 +12,7 @@
 update lams_configuration set config_value='@WILDFIRE_PASS@' where config_key='XmppPassword';
 update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where user_id=1;
 update lams_user set locale_id=(select locale_id from lams_supported_locale where language_iso_code=(SELECT SUBSTRING_INDEX('@LOCALE@', '_', 1)) and country_iso_code=(SELECT SUBSTRING_INDEX('@LOCALE@', '_', -1))) where user_id=1;
-update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where login='test';
-update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where login='test1';
-update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where login='test2';
-update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where login='test3';
-update lams_user set login='@LAMS_USER@', password=sha1('@LAMS_PASS@') where login='test4';
\ No newline at end of file
+update lams_user set password=sha1('@LAMS_PASS@') where login='test1';
+update lams_user set password=sha1('@LAMS_PASS@') where login='test2';
+update lams_user set password=sha1('@LAMS_PASS@') where login='test3';
+update lams_user set password=sha1('@LAMS_PASS@') where login='test4';
\ No newline at end of file
